140 150 160 170

O3 (ppbv)

SONEX DC-8 971013

50 55 60 65

CO (ppbv)

309 310 311

N2O (ppbv)

60 70

H2O (ppmv)

27 28 29 u (m/s)

16 18 20 v (m/s)

-0.5 0 0.5 w (m/s)

313 315 317 θ (K)

18.059 18.06 18.061 18.062 18.063 18.064 18.065 18.066 18.067 18.068 18.069 -8 -7 -6 -5 logε (W/kg)

UT (h)