-2 0 2 4 6 8 x 10^{-4}

N2 (rad 2/s2)

SONEX DC-8 1997/10/13

0 1 2 3 4 5 x 10^{-3}

(dU/dz)2 (/s2)

-0.25 0 0.25 0.5 0.75

Ri

-9 -7 -5 -3 logε (W/kg)

-1 0 1 w (m/s)

18.07 18.08 18.09 18.1 18.11 18.12 18.13 18.14 18.15 18.16 50 100 150 200

O3 (ppbv)

UT (h)