50 100 150 200

O3 (ppbv)

SONEX DC-8 1997/10/13

-1 -0.5 0 0.5 dχO3/dz (ppbv/m)

0 0.5 1 1.5 2 2.5

Kz (m2/s)

18.07 18.08 18.09 18.1 18.11 18.12 18.13 18.14 18.15 18.16

-0.5 0 0.5 1 1.5

ΦO3 (ppbv m/s)

UT (h)