60 80 100 SONEX DC-8 1997/10/15

O3 (ppbv)

0 5 10 u (m/s)

-45 -40 -35 -30 -25 v (m/s)

0

1

2 w (m/s)

15.08 15.085 15.09 15.095 15.1 15.105 15.11 15.115 15.12 15.125 15.13 300

310

320 θ (K)